D_D^(_a^*_l^)_{itz}K^{(*)} y_+ Averages

HFAG

ICHEP 2010

HFAG

ICHEP 2010

HFAG

ICHEP 2010

D_Dalitz K D*_Dalitz K D_Dalitz K*

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

PRL 105 (2010) 121801

-0.021 Α 0.048 Α 0.004

Belle

PRD 81 (2010) 112002

-0.067 Α 0.059 Α 0.018

Average

HFAG correlated average

-0.038 Α 0.038

BaBar

PRL 105 (2010) 121801

-0.032 Α 0.077 Α 0.008

Belle

PRD 81 (2010) 112002

0.157 Α 0.109

Average

HFAG correlated average

0.031 Α 0.063

BaBar

PRL 105 (2010) 121801

0.045 Α 0.106 Α 0.036

Belle

PRD 73, 112009 (2006)

-0.004 ^+_-^0^.^1^6_5^4_6 Α 0.013

Average

HFAG correlated average

0.024 Α 0.091

HFAG

ICHEP 2010

PRELIMINARY