Merged B5DK x+

HFAG

ICHEP 2010

D_Dalitz K

D_{CP} K

B5DK -0.4 -0.2 0 0.2 0.4

BaBar

PRL 105 (2010) 121801

-0.103 Α 0.037 Α 0.006

Belle

PRD 81 (2010) 112002

-0.107 Α 0.043 Α 0.011

BaBar

PRD 82 (2010) 072004

-0.057 Α 0.039 Α 0.015

Average

HFAG

-0.089 Α 0.024

HFAG

ICHEP 2010 PRELIMINARY