π^0 K_S S_{CP}

HFAG

LP 2007

-0.2 0 0.2 0.4 0.6 0.8 1

BaBar

PRD 77 (2008) 012003

0.40 Α 0.23 Α 0.03

Belle

PRD 76 (2007) 091103(R)

0.33 Α 0.35 Α 0.08

Average

HFAG correlated average

0.38 Α 0.19

HFAG

LP 2007 PRELIMINARY