ω K_S C_{CP}

HFAG

LP 2007

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6

BaBar

hep-ex/0607101

-0.43 ^+_-^0^.^2^5_3 Α 0.03

Belle

PRD 76 (2007) 091103(R)

0.09 Α 0.29 Α 0.06

Average

HFAG

-0.21 Α 0.19

HFAG

LP 2007 PRELIMINARY