D*^+ D*^- S_{CP}

HFAG

FPCP 2008

-1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0

BaBar

PRD 76 (2007) 111102(R)

-0.66 Α 0.19 Α 0.04

Belle

Moriond 2008 preliminary

-0.93 Α 0.24 Α 0.15

Average

HFAG correlated average

-0.74 Α 0.16

HFAG

FPCP 2008 PRELIMINARY