D^+ D^- S_{CP} vs C_{CP}

Contours give -2Δ(ln L) = Δχ^2 = 1, corresponding to 60.7Ψ CL for 2 dof

-1.6 -1.2 -0.8 -0.4 0 0.4 0.8

-0.8

-0.4

0

0.4

0.8

S_{CP}

C_{CP}

BaBar Belle Average

HFAG

LP 2007 PRELIMINARY