D_D^(_a^*_l^)_{itz}K^(*^) y_- Averages

HFAG

ICHEP 2014

HFAG

ICHEP 2014

HFAG

ICHEP 2014

D_Dalitz K D*_Dalitz K D_Dalitz K*

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

PRL 105 (2010) 121801

0.062 Α 0.045 Α 0.004

Belle

PRD 81 (2010) 112002

0.177 Α 0.060 Α 0.018

LHCb

NPB 888 (2014) 169

0.013 Α 0.048 ^+_-^0^.^0^0^9_7

Average

HFAG correlated average

0.075 Α 0.029

BaBar

PRL 105 (2010) 121801

-0.052 Α 0.063 Α 0.009

Belle

PRD 81 (2010) 112002

-0.252 Α 0.112

Average

HFAG correlated average

-0.107 Α 0.055

BaBar

PRL 105 (2010) 121801

0.127 Α 0.095 Α 0.027

Belle

PRD 73, 112009 (2006)

-0.281 ^+_-^0^.^4_3^4_3^0_5 Α 0.046

Average

HFAG correlated average

0.091 Α 0.096

HFAG

ICHEP 2014

PRELIMINARY