D^+ D^- S_{CP}

HFAG

ICHEP 2016

-1.8 -1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4

BaBar

PRD 79, 032002 (2009)

-0.63 Α 0.36 Α 0.05

Belle

PRD 85 (2012) 091106

-1.06 ^+_-^0^.^2_1^1_4 Α 0.08

LHCb

arXiv:1608.06620

-0.54 ^+_-^0^.^1^7_6 Α 0.05

Average

HFAG correlated average

-0.84 Α 0.12

HFAG

ICHEP 2016 PRELIMINARY