ρ^+ ρ^- C_{CP}

HFAG

EPS 2015

-0.3 -0.2 -0.1 0 0.1 0.2 0.3

BaBar

PRD 76 (2007) 052007

0.01 Α 0.15 Α 0.06

Belle

arXiv:1510.01245

0.00 Α 0.10 Α 0.06

Average

HFAG correlated average

0.00 Α 0.09

HFAG

EPS 2015 PRELIMINARY