ϕ K^0 S_{CP}

HFAG

Moriond 2012

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

BaBar

PRD 85 (2012) 112010

0.66 Α 0.17 Α 0.07

Belle

PRD 82 (2010) 073011

0.90 ^+_-^0^.^0_1^9

Average

HFAG

0.74 ^+_-^0^.^1^1_3

HFAG

Moriond 2012 PRELIMINARY