sin(2β^{eff}) ( sin(2ϕ^e_1^{ff})

HFAG

Moriond 2015

HFAG

Moriond 2015

HFAG

Moriond 2015

HFAG

Moriond 2015

HFAG

Moriond 2015 b5ccs

J/ψ π^0

J/ψ ρ^0

D^+ D^-

D*^+ D*^-

-1 0 1 2

World Average HFAG (Moriond 2015)

0.69 Α 0.02

BaBar PRL 101 (2008) 021801

1.23 Α 0.21 Α 0.04

Belle PRD 77 (2008) 071101(R)

0.65 Α 0.21 Α 0.05

Average HFAG correlated average

0.93 Α 0.15

LHCb PLB 742 (2015) 38

0.66 ^+_-^0^.^1^2_3 ^+_-^0^.^0^3_9

Average HFAG correlated average

0.66 Α 0.14

BaBar PRD 79, 032002 (2009)

0.63 Α 0.36 Α 0.05

Belle PRD 85 (2012) 091106

1.06 ^+_-^0^.^1_2^4_1 Α 0.08

Average HFAG correlated average

0.98 Α 0.17

BaBar PRD 79, 032002 (2009)

0.70 Α 0.16 Α 0.03

BaBar part. rec. PRD 86 (2012) 112006

0.49 Α 0.18 Α 0.07 Α 0.04

Belle PRD 86 (2012) 071103(R)

0.79 Α 0.13 Α 0.03

Average HFAG correlated average

0.71 Α 0.09

HFAG

Moriond 2015 PRELIMINARY