a_1^{+-} π^{-+} ΔC

HFAG

CKM 2012

-0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

BaBar

PRL 98 (2007) 181803

0.26 Α 0.15 Α 0.07

Belle

PRD 86 (2012) 092012

0.54 Α 0.11 Α 0.07

Average

HFAG correlated average

0.43 Α 0.10

HFAG

CKM 2012 PRELIMINARY