D*_Dγ_Kπ K R_{ADS}

HFAG

LP 2011

-0.01 0 0.01 0.02 0.03 0.04 0.05 0.06 0.07

BaBar

PRD 82 (2010) 072006

0.013 Α 0.014 Α 0.008

Belle

LP 2011 preliminary

0.036 ^+_-^0^.^0^1^4_2 Α 0.002

Average

HFAG

0.027 Α 0.010

HFAG

LP 2011 PRELIMINARY