D*_Dγ_Kπ K A_{ADS}

HFAG

LP 2011

-3 -2 -1 0 1 2

BaBar

PRD 82 (2010) 072006

0.36 Α 0.94 ^+_-^0^.^2_4^5_1

Belle

LP 2011 preliminary

-0.51 ^+_-^0^.^3_2^3_9 Α 0.08

Average

HFAG

-0.43 Α 0.31

HFAG

LP 2011 PRELIMINARY