π^0 K^0 S_{CP}

HFAG

CKM2008

-0 0.2 0.4 0.6 0.8 1 1.2

BaBar

arXiv:0809.1174

0.55 Α 0.20 Α 0.03

Belle

arXiv:0809.4366

0.67 Α 0.31 Α 0.08

Average

HFAG correlated average

0.57 Α 0.17

HFAG

CKM2008 PRELIMINARY