sin(2β) ( sin(2ϕ_1)

HFAG

ICHEP 2008

0.5 0.6 0.7 0.8

BaBar arXiv:0808.1903

0.691 Α 0.029 Α 0.014

Belle J/ψ K^0 PRL 98 (2007) 031802

0.642 Α 0.031 Α 0.017

Belle ψ(2S) K_S PRD 77 (2008) 091103(R)

0.718 Α 0.090 Α 0.033

Average HFAG

0.671 Α 0.024

HFAG

ICHEP 2008 PRELIMINARY