D*^{+-} D^{-+} S_{+-}

HFAG

ICHEP 2008

-1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2

BaBar

arXiv:0808.1866

-0.63 Α 0.21 Α 0.03

Belle

PRL 93 (2004) 201802

-0.55 Α 0.39 Α 0.12

Average

HFAG

-0.61 Α 0.19

HFAG

ICHEP 2008 PRELIMINARY