-3 -2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

sin(2β_{eff})

J/ψπ^0 D*^{+–}D^{–+} D*^+D*^–

BABAR 02

Belle 03

Average

BABAR 03

BABAR 03 Μ+–Ν

BABAR 03 Μ–+Ν

Charmonium (average)

–0.05Α0.49Α0.16

0.72Α0.42Α0.08

0.40Α0.33

–0.06Α0.37Α0.13

0.82Α0.75Α0.14

0.24Α0.69Α0.12

0.736Α0.049

0.736Α0.049

HFAG

Summer 2003