-3 -2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

sin(2β_{(eff)})

Charmonium Modes ϕK^0_S η^,K^0_S KKK^0_S

OPAL 98 ALEPH 00 CDF 00 BABAR 02 Belle 03 Average (charmonium) BABAR 03 Belle 03 BABAR 03 Belle 03 Belle 03 Average (s penguin) Average (All)

3.2^{+ 1.8}_{– 2.0} Α0.5 0.84^{+ 0.82}_{– 1.04} Α0.16 0.79^{+ 0.41}_{– 0.44} 0.741Α0.067Α0.034 0.733Α0.057Α0.028 0.736Α0.049 0.45Α0.43Α0.07 –0.96Α0.5^{+ 0.09}_{– 0.11} 0.02Α0.34Α0.03 0.43Α0.27Α0.05 0.51Α0.26^{+ 0.19}_{– 0.05} 0.24Α0.15

0.695Α0.047

0.24Α0.15

HFAG

Summer 2003