D_D^(_a^*_l^)_{itz}K^(*^) x_- Averages

HFLAV

Summer 2016

HFLAV

Summer 2016

HFLAV

Summer 2016

HFLAV

Summer 2016

HFLAV

Summer 2016

HFLAV

Summer 2016

D_Dalitz K D*_Dalitz K

D_Dalitz K* D_{CP} K

D*_{CP} K D_{CP} K*

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6

BaBar

PRL 105 (2010) 121801

0.060 Α 0.039 Α 0.007

Belle

PRD 81 (2010) 112002

0.105 Α 0.047 Α 0.011

LHCb

NPB 888 (2014) 169

0.027 Α 0.044 ^+_-^0^.^0^1_0^0_8

Average

HFLAV correlated average

0.070 Α 0.025

BaBar

PRL 105 (2010) 121801

-0.104 Α 0.051 Α 0.019

Belle

PRD 81 (2010) 112002

-0.023 Α 0.112

Average

HFLAV correlated average

-0.081 Α 0.049

BaBar

PRL 105 (2010) 121801

0.075 Α 0.096 Α 0.029

Belle

PRD 73, 112009 (2006)

-0.784 ^+_-^0^.^2^4_9^9_5 Α 0.029

Average

HFLAV correlated average

-0.043 Α 0.094

BaBar

PRD 82 (2010) 072004

0.132 Α 0.042 Α 0.018

Average

HFLAV

0.132 Α 0.046

BaBar

PRD 78, 092002 (2008)

0.000 Α 0.060 Α 0.010

Average

HFLAV

0.000 Α 0.061

BaBar

PRD 80, 092001 (2009)

0.400 Α 0.140 Α 0.050

Average

HFLAV

0.400 Α 0.149

HFLAV

Summer 2016