π^0 π^0 K_S C_{CP}

HFLAV

Summer 2018

-1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 1.2

BaBar

PRD 76 (2007) 071101

0.23 Α 0.52 Α 0.13

Belle

PR D99 (2019) 011102

-0.28 Α 0.21 Α 0.04

Average

HFLAV correlated average

-0.21 Α 0.20

HFLAV

Summer 2018 PRELIMINARY