π^0 K^0 S_{CP}

HFLAV

Moriond 2024

-0 0.2 0.4 0.6 0.8 1 1.2

BaBar

PRD 79 (2009) 052003

0.55 Α 0.20 Α 0.03

Belle

PRD 81 (2010) 011101

0.67 Α 0.31 Α 0.08

Belle II

PRL 131 (2023) 111803

0.75 ^+_-^0^.^2^0_3 Α 0.04

Average

HFLAV correlated average

0.64 Α 0.13

HFLAV

Moriond 2024 PRELIMINARY