K_S K_S K_S C_{CP}

HFLAV

Moriond 2021

-0.5 -0.4 -0.3 -0.2 -0.1 0 0.1 0.2

BaBar

PRD 85 (2012) 054023

-0.17 Α 0.18 Α 0.04

Belle

PRD 103 (2021) 032003

-0.12 Α 0.16 Α 0.05

Average

HFLAV correlated average

-0.15 Α 0.12

HFLAV

Moriond 2021 PRELIMINARY