D*_Dalitz K x_Α vs y_Α modInd

Contours give -2Δ(ln L) = Δχ^2 = 1, corresponding to 39.3Ψ CL for 2 dof

-0.2 -0.1 0 0.1 0.2

-0.2

-0.1

0

0.1

0.2

x+ y+ LHCb full rec B^+ LHCb part rec B^+ LHCb full rec B^- LHCb part rec B^- Averages

HFLAV

Moriond 2024 PRELIMINARY