D_Kππ^0 π R_{ADS}

HFLAV

Moriond 2022

0.00080.0010.00120.00140.00160.00180.0020.00220.00240.00260.00280.0030.00320.0034

Belle

PRD 88 (2013) 091104(R)

0.00189 Α 0.00054 ^+_-^0^.^0^0^0^2^2_5

LHCb

arXiv:2112.10617

0.00207 Α 0.00020 Α 0.00003

Average

HFLAV

0.00205 Α 0.00019

HFLAV

Moriond 2022 PRELIMINARY