R_{ADS} Averages

HFAG

FPCP 2015

HFAG

FPCP 2015

HFAG

FPCP 2015

HFAG

FPCP 2015

HFAG

FPCP 2015

HFAG

FPCP 2015

D_Kπ π D_Kππ^0 π

D_K3π π D*_Dπ^0_Kπ π

D*_Dγ_Kπ π D_Kπ 3π

-0.008 -0.006 -0.004 -0.002 0 0.002 0.004 0.006 0.008 0.01 0.012

BaBar

PRD 82 (2010) 072006

0.0033 Α 0.0006 Α 0.0004

Belle

PRL 106 (2011) 231803

0.0033 Α 0.0004 ^+_-^0^.^0^0^0^1_2 CDF PRD 84 (2011) 091504

0.0028 Α 0.0007 Α 0.0004

LHCb

PLB 712 (2012) 203

0.0041 Α 0.0003 Α 0.0001

Average

HFAG

0.0038 Α 0.0002

Belle

PRD 88 (2013) 091104(R)

0.0019 Α 0.0005 ^+_-^0^.^0^0^0^2_3

LHCb

arXiv:1504.05442

0.0024 Α 0.0005 Α 0.0000

Average

HFAG

0.0022 Α 0.0004

LHCb

PLB 723 (2013) 44

0.0037 Α 0.0004

Average

HFAG

0.0037 Α 0.0004

BaBar

PRD 82 (2010) 072006

0.0032 Α 0.0009 Α 0.0008

Belle

LP 2011 preliminary

0.0040 ^+_-^0^.^0^0^1_0^0_9 Α 0.0003

Average

HFAG

0.0037 Α 0.0008

BaBar

PRD 82 (2010) 072006

0.0027 Α 0.0014 Α 0.0022

Belle

LP 2011 preliminary

0.0041 ^+_-^0^.^0^0^1^1_0 Α 0.0001

Average

HFAG

0.0039 Α 0.0010

LHCb

arXiv:1505.07044

0.0043 Α 0.0004

Average

HFAG

0.0043 Α 0.0004

HFAG

FPCP 2015 PRELIMINARY