D_Kππ^0 π R_{ADS}

HFAG

Moriond 2015

0.0008 0.001 0.00120.00140.00160.0018 0.002 0.00220.00240.00260.0028 0.003 0.00320.00340.0036

Belle

PRD 88 (2013) 091104(R)

0.00189 Α 0.00054 ^+_-^0^.^0^0^0^2^2_5

LHCb

arXiv:1504.05442

0.00235 Α 0.00049 Α 0.00004

Average

HFAG

0.00216 Α 0.00038

HFAG

Moriond 2015 PRELIMINARY