D_Kππ^0 K R_{ADS}

HFAG

Moriond 2015

-0 0.01 0.02 0.03

BaBar

PRD 84 (2011) 012002

0.0091 ^+_-^0^.^0^0^8_7^2_6 ^+_-^0^.^0^0^1_3^4_7

Belle

PRD 88 (2013) 091104(R)

0.0198 Α 0.0062 Α 0.0024

LHCb

arXiv:1504.05442

0.0140 Α 0.0047 Α 0.0019

Average

HFAG

0.0148 Α 0.0036

HFAG

Moriond 2015 PRELIMINARY