D_Kπ K R_{ADS}

HFAG

Moriond 2012

-0 0.01 0.02 0.03

BaBar

PRD 82 (2010) 072006

0.0110 Α 0.0060 Α 0.0020

Belle

PRL 106 (2011) 231803

0.0163 ^+_-^0^.^0^0^4^4_1 ^+_-^0^.^0^0^0_1^7_3 CDF PRD 84 (2011) 091504

0.0220 Α 0.0086 Α 0.0026

LHCb

arXiv:1203.3662

0.0152 Α 0.0020 Α 0.0004

Average

HFAG

0.0153 Α 0.0017

HFAG

Moriond 2012 PRELIMINARY