b5sγ C_{CP}

HFAG

ICHEP 2010

HFAG

ICHEP 2010

HFAG

ICHEP 2010

HFAG

ICHEP 2010

HFAG

ICHEP 2010

K* γ

K_S π^0 γ

K_S η γ

K_S ρ^0 γ

K_S ϕ γ

-1.8 -1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar PRD 78 (2008) 071102

-0.14 Α 0.16 Α 0.03

Belle PRD 74 (2006) 111104

0.20 Α 0.24 Α 0.05

Average HFAG correlated average

-0.04 Α 0.14

BaBar PRD 78 (2008) 071102

-0.19 Α 0.14 Α 0.03

Belle PRD 74 (2006) 111104(R)

0.20 Α 0.20 Α 0.06

Average HFAG correlated average

-0.07 Α 0.12

BaBar PRD 79 (2009) 011102

-0.32 ^+_-^0^.^4_3^0_9 Α 0.07

Average HFAG correlated average

-0.32 Α 0.40

Belle PRL 101 (2008) 251601

-0.05 Α 0.18 Α 0.06

Average HFAG correlated average

-0.05 Α 0.19

Belle arXiv:1104.5590

-0.35 Α 0.58 ^+_-^0^.^1_2^0_3

Average HFAG correlated average

-0.35 Α 0.60

HFAG

ICHEP 2010

PRELIMINARY