R_{ADS} Averages

HFAG

PLHC 2011

HFAG

PLHC 2011

HFAG

PLHC 2011

D_Kπ π D*_Dπ^0_Kπ π

D*_Dγ_Kπ π

-0.008 -0.006 -0.004 -0.002 0 0.002 0.004 0.006 0.008 0.01 0.012

BaBar

PRD 82 (2010) 072006

0.0033 Α 0.0006 Α 0.0004

Belle

arXiv:1103.5951

0.0033 Α 0.0004 ^+_-^0^.^0^0^0^1_2 CDF PLHC2011 preliminary

0.0028 Α 0.0007 Α 0.0004

Average

HFAG

0.0032 Α 0.0003

BaBar

PRD 82 (2010) 072006

0.0032 Α 0.0009 Α 0.0008

Average

HFAG

0.0032 Α 0.0012

BaBar

PRD 82 (2010) 072006

0.0027 Α 0.0014 Α 0.0022

Average

HFAG

0.0027 Α 0.0026

HFAG

PLHC 2011 PRELIMINARY