ρ^0 K_S S_{CP}

HFAG

EndOfYear 2009

-0.2 0 0.2 0.4 0.6 0.8 1 1.2

BaBar

PRD 80 (2009) 112001

0.35 ^+_-^0^.^2_3^6_1 Α 0.06 Α 0.03

Belle

PRD 79 (2009) 072004

0.64 ^+_-^0^.^1_2^9_5 Α 0.09 Α 0.10

Average

HFAG

0.54 ^+_-^0^.^1_2^8_1

HFAG

EndOfYear 2009 PRELIMINARY