ρ^{+-}π^{-+} A_{CP}

HFAG

ICHEP 2008

-0.26 -0.24 -0.22 -0.2 -0.18 -0.16 -0.14 -0.12 -0.1 -0.08 -0.06 -0.04 -0.02 0

BaBar

PRD 76 (2007) 012004

-0.14 Α 0.05 Α 0.02

Belle

PRL 98 (2007) 221602

-0.12 Α 0.05 Α 0.04

Average

HFAG correlated average

-0.13 Α 0.04

HFAG

ICHEP 2008 PRELIMINARY