β ( ϕ_1

ρ^– η^–

-0.2 0 0.2 0.4 0.6 0.8 1

-0.2 0 0.2 0.4 0.6 0.8 1 β ( ϕ_1 = (21.1 Α 0.9)˚ β ( ϕ_1 = (68.9 Α 0.9)˚

DISFAVOURED BY J/ψK*, D*D*K_S ω Dh^0

HFAG

FPCP 2009 PRELIMINARY