R_{ADS} Averages

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

D_Kπ K D*_Dπ^0_Kπ K

D*_Dγ_Kπ K D_Kπ K*

D_Kππ^0 K D_Kπ π D*_Dπ^0_Kπ π D*_Dγ_Kπ π

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

BaBar

EPS 2009 preliminary

0.014 Α 0.005 Α 0.003

Belle

PRD 78 (2008) 071901

0.008 Α 0.006 ^+_-^0^.^0^0^2_3

Average

HFAG

0.011 Α 0.004

BaBar

EPS 2009 preliminary

0.018 Α 0.009 Α 0.004

Average

HFAG

0.018 Α 0.010

BaBar

EPS 2009 preliminary

0.013 Α 0.014 Α 0.007

Average

HFAG

0.013 Α 0.016

BaBar

arXiv:0909.3981

0.066 Α 0.031 Α 0.010

Average

HFAG

0.066 Α 0.033

BaBar

PRD 76 (2007) 111101

0.012 Α 0.012 Α 0.009

Average

HFAG

0.012 Α 0.015

BaBar

EPS 2009 preliminary

0.003 Α 0.001 Α 0.000

Belle

PRD 78 (2008) 071901

0.003 Α 0.001 Α 0.000

Average

HFAG

0.003 Α 0.000

BaBar

EPS 2009 preliminary

0.003 Α 0.001 Α 0.001

Average

HFAG

0.003 Α 0.001

BaBar

EPS 2009 preliminary

0.003 Α 0.001 Α 0.002

Average

HFAG

0.003 Α 0.003

HFAG

Beauty 2009 PRELIMINARY