K_S K_S C_{CP}

HFAG

ICHEP 2008

-1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

PRL 97 (2006) 171805

-0.40 Α 0.41 Α 0.06

Belle

PRL 100 (2008) 121601

0.38 Α 0.38 Α 0.05

Average

HFAG correlated average

-0.06 Α 0.26

HFAG

ICHEP 2008 PRELIMINARY