D*^+ D*^- S_{CP}

HFAG

Winter 2009

-1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0

BaBar

PRD 79, 032002 (2009)

-0.71 Α 0.16 Α 0.03

Belle

PRD 80 (2009) 111104

-0.96 Α 0.25 ^+_-^0^.^1^2_6

Average

HFAG correlated average

-0.77 Α 0.14

HFAG

Winter 2009 PRELIMINARY