D^{(*)}h^0 cos(2β) ( cos(2ϕ_1)

HFAG

LP 2007

-0.4 -0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2

BaBar

PRL 99, 231802 (2007)

0.42 Α 0.49 Α 0.09 Α 0.13

Belle

PRL 97, 081801 (2006)

1.87 ^+_-^0^.^4_5^0_3 ^+_-^0^.^2_3^2

Average

HFAG

1.01 Α 0.40

HFAG

LP 2007 PRELIMINARY