D_D^(_a^*_l^)_{itz}K^{(*)} y_+ Averages

HFAG

ICHEP 2008

HFAG

ICHEP 2008

HFAG

ICHEP 2008

D_Dalitz K D*_Dalitz K D_Dalitz K*

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

PRD 78 (2008) 034023

-0.015 Α 0.055 Α 0.006

Belle

arXiv:0803.3375

-0.067 Α 0.059 Α 0.018

Average

HFAG correlated average

-0.037 Α 0.041

BaBar

PRD 78 (2008) 034023

0.080 Α 0.102 Α 0.010

Belle

arXiv:0803.3375

0.130 Α 0.120 Α 0.022

Average

HFAG correlated average

0.100 Α 0.078

BaBar

PRD 78 (2008) 034023

0.125 Α 0.139 Α 0.051

Belle

PRD 73, 112009 (2006)

-0.004 ^+_-^0^.^1^6_5^4_6 Α 0.013

Average

HFAG correlated average

0.067 Α 0.108

HFAG

ICHEP 2008

PRELIMINARY