D_D^(_a^*_l^)_{itz}K^{(*)} x_+ Averages

HFAG

ICHEP 2008

HFAG

ICHEP 2008

HFAG

ICHEP 2008

D_Dalitz K D*_Dalitz K D_Dalitz K*

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

PRD 78 (2008) 034023

-0.067 Α 0.043 Α 0.014

Belle

arXiv:0803.3375

-0.107 Α 0.043 Α 0.011

Average

HFAG correlated average

-0.087 Α 0.032

BaBar

PRD 78 (2008) 034023

0.137 Α 0.068 Α 0.014

Belle

arXiv:0803.3375

0.133 Α 0.083 Α 0.018

Average

HFAG correlated average

0.136 Α 0.054

BaBar

PRD 78 (2008) 034023

-0.113 Α 0.107 Α 0.028

Belle

PRD 73, 112009 (2006)

-0.105 ^+_-^0^.^1^7_6^7 Α 0.006

Average

HFAG correlated average

-0.117 Α 0.092

HFAG

ICHEP 2008

PRELIMINARY