Merged B5DK x+

HFAG

CKM2008

D_Dalitz K

D_{CP} K

B5DK -0.4 -0.2 0 0.2 0.4

BaBar

PRD 78 (2008) 034023

-0.067 Α 0.043 Α 0.014

Belle

arXiv:0803.3375

-0.107 Α 0.043 Α 0.011

BaBar

PRD 77, 111102 (2008)

-0.090 Α 0.050 Α 0.020

Average

HFAG

-0.088 Α 0.027

HFAG

CKM2008 PRELIMINARY