sin(2β) ( sin(2ϕ_1)

0.5 0.6 0.7 0.8

BaBar hep-ex/0703021

0.714 Α 0.032 Α 0.018

Belle PRL 98 (2007) 031802

0.642 Α 0.031 Α 0.017

Average HFAG

0.678 Α 0.026

HFAG

Moriond 2007 PRELIMINARY