sin(2β)/sin(2ϕ_1)

0.5 0.6 0.7 0.8

BaBar PRL 94, 161803 (2005)

0.722 Α 0.040 Α 0.023

Belle BELLE-CONF-0569

0.652 Α 0.039 Α 0.020

Average HFAG

0.685 Α 0.032

HFAG

HEP 2005 PRELIMINARY