K_S π^0 γ C_{CP}

HFAG

HEP 2005

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4

BaBar

PRD 72 (2005) 051103

-0.48 Α 0.22

Belle

BELLE-CONF-0570

-0.12 Α 0.27 Α 0.10

Average

HFAG

-0.35 Α 0.17

HFAG

HEP 2005 PRELIMINARY