-2 -1.75 -1.5 -1.25 -1 -0.75 -0.5 -0.25 0 S_{ππ}

Average (Moriond 05)

BABAR (2004)

Belle (2005)

Average

–0.30Α0.17Α0.03

–0.67Α0.16Α0.06

–0.50Α0.12

-0.5Α0.12 HFAG

Moriond 2005