-1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2 C_{ππ}

Average (Moriond 05)

BABAR (2004)

Belle (2005)

Average

–0.09Α0.15Α0.04

–0.56Α0.12Α0.06

–0.37Α0.10

-0.37Α0.1 HFAG

Moriond 2005