D_K^(_π^*_π^)K^{(*)} x_+ Averages

HFAG

ICHEP 2006

HFAG

ICHEP 2006

HFAG

ICHEP 2006

D_Dalitz K D*_Dalitz K D_Dalitz K*

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

ICHEP 2006 preliminary

-0.072 Α 0.056 Α 0.014 Α 0.029

Belle

PRD 73, 112009 (2006)

-0.135 ^+_-^0^.^0^6_7^9_0 Α 0.017 Α 0.051

Average

HFAG correlated average

-0.097 Α 0.045

BaBar

ICHEP 2006 preliminary

0.084 Α 0.088 Α 0.015 Α 0.018

Belle

PRD 73, 112009 (2006)

0.032 ^+_-^0^.^1^2_1^0_6 Α 0.004 Α 0.049

Average

HFAG correlated average

0.067 Α 0.071

BaBar

hep-ex/0507101

-0.070 Α 0.230 Α 0.130 Α 0.030

Belle

PRD 73, 112009 (2006)

-0.105 ^+_-^0^.^1^7_6^7 Α 0.006 Α 0.088

Average

HFAG correlated average

-0.094 Α 0.144

HFAG

ICHEP 2006

PRELIMINARY