ρ^+ ρ^- S_{CP}

HFAG

CKM 2006

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8

BaBar

hep-ex/0607098

-0.19 Α 0.21 ^+_-^0^.^0^5_7

Belle

hep-ex/0702009

0.19 Α 0.30 Α 0.07

Average

HFAG correlated average

-0.06 Α 0.18

HFAG

CKM 2006 PRELIMINARY