ρ^{+-}π^{-+} ΔS

HFAG

ICHEP 2006

-0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3

BaBar

hep-ex/0608002

0.06 Α 0.13 Α 0.03

Belle

hep-ex/0609003

-0.12 Α 0.14 Α 0.07

Average

HFAG correlated average

-0.02 Α 0.10

HFAG

ICHEP 2006 PRELIMINARY