sin(2β) ( sin(2ϕ_1)

0.5 0.6 0.7 0.8

BaBar hep-ex/0607107

0.710 Α 0.034 Α 0.019

Belle hep-ex/0608039

0.642 Α 0.031 Α 0.017

Average HFAG

0.674 Α 0.026

HFAG

ICHEP 2006 PRELIMINARY